structural constituent of cuticle, p<0.01 homeostasis, p<0.01

6.755

-7.028 optimized motif location

MI (bits) z-score robustness position bias orientation bias conservation index seedmotif name

5’ 0.020 15.6 10/10 - - 1.00 AGGCGCA -

3’UTR 0.020 15.1 10/10 Y 1.00 UUCCCCC -

5’ 0.012 5.7 6/10 - - 0.62 ACAACTG -

1

over-representation under-representation